<script setup lang="ts">
import { fr } from "@nuxt/ui/locale";
</script>

<template>
  <UApp id="layout-default" :locale="fr">
    <SiteHeader />
    <UMain>
      <slot />
    </UMain>
    <SiteFooter />
  </UApp>
</template>
